-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.129639251294
cusum  =  0.155273812033
eta  =  0.600317919019
hl_amp_ratio  =  0.563297341417
kurtosis  =  -0.474325939897
n_points  =  256
period  =  0.691124645128
period_SNR  =  32.0454546342
period_log10FAP  =  -26.9254437755
period_uncertainty  =  0.00023437887907
phase_cusum  =  0.279561785474
phase_eta  =  0.267790991194
phi21  =  0.990726979519
phi31  =  2.18998447506
quartile31  =  0.19
r21  =  0.567425823649
r31  =  0.395983144439
shapiro_w  =  0.956291377544
skewness  =  -0.572229634208
slope_per10  =  -0.309310133384
slope_per90  =  0.252851599945
stetson_k  =  0.76397081246
weighted_mean  =  15.7553872225
weighted_std  =  0.127890732225
