-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.304768549361
cusum  =  0.0971456664555
eta  =  0.542622149783
hl_amp_ratio  =  0.35814938864
kurtosis  =  -1.15601411658
n_points  =  257
period  =  0.591426320793
period_SNR  =  35.9947414755
period_log10FAP  =  -32.6627350205
period_uncertainty  =  0.000119625069779
phase_cusum  =  0.253938984751
phase_eta  =  0.112255187488
phi21  =  1.17711728459
phi31  =  -0.700293028057
quartile31  =  0.49
r21  =  0.502217651086
r31  =  0.370066967759
shapiro_w  =  0.895721018314
skewness  =  -0.508886075933
slope_per10  =  -0.175700244466
slope_per90  =  0.33794659321
stetson_k  =  0.755879125803
weighted_mean  =  14.5526493123
weighted_std  =  0.294866323839
