-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.86


######### Lightcurve features #########

amplitude  =  0.415708857266
cusum  =  0.167198943046
eta  =  0.501185596222
hl_amp_ratio  =  0.266880938253
kurtosis  =  -0.992796564067
n_points  =  270
period  =  0.469468894924
period_SNR  =  42.3232973435
period_log10FAP  =  -38.2659461357
period_uncertainty  =  0.000113623951871
phase_cusum  =  0.304269227829
phase_eta  =  0.070671507502
phi21  =  3.94012868844
phi31  =  4.68408090412
quartile31  =  0.6475
r21  =  0.439020475034
r31  =  0.323555059828
shapiro_w  =  0.844184875488
skewness  =  -0.698157514768
slope_per10  =  -0.112898280886
slope_per90  =  0.26464068791
stetson_k  =  0.735512361495
weighted_mean  =  15.2163198086
weighted_std  =  0.395230689096
