-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.226955891377
cusum  =  0.194443167132
eta  =  0.820090840888
hl_amp_ratio  =  0.608567559579
kurtosis  =  0.168254485679
n_points  =  164
period  =  0.548624084215
period_SNR  =  22.8591652031
period_log10FAP  =  -14.8851588287
period_uncertainty  =  0.000113798819295
phase_cusum  =  0.243779039024
phase_eta  =  0.670984896541
phi21  =  -2.17006121963
phi31  =  -4.37193497914
quartile31  =  0.25
r21  =  0.397617723298
r31  =  0.285048162542
shapiro_w  =  0.948757588863
skewness  =  -0.76804455924
slope_per10  =  -0.122664803956
slope_per90  =  0.379464902166
stetson_k  =  0.776605277025
weighted_mean  =  13.645428769
weighted_std  =  0.194040773266
