<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.42


######### Lightcurve features #########

amplitude  =  0.0347246515489
cusum  =  0.0904983657227
eta  =  1.80821404662
hl_amp_ratio  =  0.841849502682
kurtosis  =  0.477952565862
n_points  =  251
period  =  0.434944924489
period_SNR  =  9.87670960029
period_log10FAP  =  -0.0310366497639
period_uncertainty  =  4.64213596716e-05
phase_cusum  =  0.107403674742
phase_eta  =  1.76015662283
phi21  =  0.893872738257
phi31  =  2.21901964867
quartile31  =  0.1
r21  =  0.318993135994
r31  =  0.285314199618
shapiro_w  =  0.991225063801
skewness  =  -0.0647853430126
slope_per10  =  -0.131828499223
slope_per90  =  0.106250596713
stetson_k  =  0.771759606999
weighted_mean  =  17.3526041875
weighted_std  =  0.0748996349401
</pre></body></html>