-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.200630804211
cusum  =  0.159033427823
eta  =  0.496849189629
hl_amp_ratio  =  0.479613409646
kurtosis  =  -0.384912366169
n_points  =  385
period  =  0.603742137546
period_SNR  =  42.6157300327
period_log10FAP  =  -37.238960227
period_uncertainty  =  0.000166228573915
phase_cusum  =  0.183631006311
phase_eta  =  0.952004624852
phi21  =  -2.2699031341
phi31  =  -2.56676578495
quartile31  =  0.29
r21  =  0.275244573028
r31  =  0.0778623636
shapiro_w  =  0.943076968193
skewness  =  -0.681109573386
slope_per10  =  -0.101929492013
slope_per90  =  0.102793969552
stetson_k  =  0.742017530491
weighted_mean  =  15.4016357026
weighted_std  =  0.216911645826
