-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.26


######### Lightcurve features #########

amplitude  =  0.120375054868
cusum  =  0.0879827061934
eta  =  0.568351159787
hl_amp_ratio  =  1.15836093057
kurtosis  =  -1.31013112246
n_points  =  403
period  =  0.214601103648
period_SNR  =  64.3632430977
period_log10FAP  =  -70.2316200357
period_uncertainty  =  1.28694770911e-05
phase_cusum  =  0.309331471956
phase_eta  =  0.230757333428
phi21  =  -0.0793909680409
phi31  =  0.0652622717489
quartile31  =  0.17
r21  =  0.119442821241
r31  =  0.00873075031238
shapiro_w  =  0.942624986172
skewness  =  0.0704246485782
slope_per10  =  -0.0661127633692
slope_per90  =  0.0768978692178
stetson_k  =  0.884021779432
weighted_mean  =  15.1249890117
weighted_std  =  0.0915796577365
