<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.336972435248
cusum  =  0.121426770948
eta  =  0.479750627458
hl_amp_ratio  =  0.654616411238
kurtosis  =  -1.11952446872
n_points  =  320
period  =  0.595771010922
period_SNR  =  41.4985713204
period_log10FAP  =  -43.3045778082
period_uncertainty  =  0.000119027244546
phase_cusum  =  0.259498911815
phase_eta  =  0.275651338515
phi21  =  -2.1358479232
phi31  =  -3.95835208913
quartile31  =  0.535
r21  =  0.385304014977
r31  =  0.259015128841
shapiro_w  =  0.931171894073
skewness  =  -0.385753311696
slope_per10  =  -0.0843494448431
slope_per90  =  0.178881008724
stetson_k  =  0.834472731444
weighted_mean  =  15.968817931
weighted_std  =  0.303646363479
</pre></body></html>