-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.75


######### Lightcurve features #########

amplitude  =  0.380037893685
cusum  =  0.121955877182
eta  =  0.649962068372
hl_amp_ratio  =  1.01222505238
kurtosis  =  -1.1632270146
n_points  =  197
period  =  0.713090614289
period_SNR  =  28.4259502927
period_log10FAP  =  -21.6078962104
period_uncertainty  =  0.000147601143322
phase_cusum  =  0.2466558229
phase_eta  =  0.339095132642
phi21  =  1.06626945215
phi31  =  -0.770300894788
quartile31  =  0.56
r21  =  0.461034808363
r31  =  0.253833345055
shapiro_w  =  0.955232381821
skewness  =  -0.0611257433471
slope_per10  =  -0.28149711753
slope_per90  =  0.372987127342
stetson_k  =  0.881454460806
weighted_mean  =  12.3000487927
weighted_std  =  0.325307326802
