<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.317008022112
cusum  =  0.156607622419
eta  =  0.473295130898
hl_amp_ratio  =  0.367902566496
kurtosis  =  0.417585728092
n_points  =  310
period  =  0.622349404845
period_SNR  =  30.347989372
period_log10FAP  =  -27.8264425448
period_uncertainty  =  0.000108294950744
phase_cusum  =  0.229137064298
phase_eta  =  0.488422353764
phi21  =  -2.17635336207
phi31  =  -1.30762728927
quartile31  =  0.3
r21  =  0.495873178764
r31  =  0.35404057241
shapiro_w  =  0.89306563139
skewness  =  -1.08613473445
slope_per10  =  -0.101368707653
slope_per90  =  0.19773333411
stetson_k  =  0.712513182435
weighted_mean  =  12.681503017
weighted_std  =  0.264129285791
</pre></body></html>