-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.67


######### Lightcurve features #########

amplitude  =  0.163496412751
cusum  =  0.10320616066
eta  =  0.547732890599
hl_amp_ratio  =  0.893988640039
kurtosis  =  -0.705557416073
n_points  =  313
period  =  0.479498548258
period_SNR  =  18.0952082887
period_log10FAP  =  -15.9688036837
period_uncertainty  =  0.000102659865946
phase_cusum  =  0.200476852013
phase_eta  =  1.29121739651
phi21  =  0.616060167387
phi31  =  1.49696866943
quartile31  =  0.33
r21  =  0.250162318618
r31  =  0.150740039021
shapiro_w  =  0.980174720287
skewness  =  -0.229847166919
slope_per10  =  -0.057929626929
slope_per90  =  0.0837007973308
stetson_k  =  0.828560161029
weighted_mean  =  16.0699031452
weighted_std  =  0.205572031662
