-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.190247363912
cusum  =  0.142605478078
eta  =  0.412873750526
hl_amp_ratio  =  0.654738917346
kurtosis  =  -0.948927497737
n_points  =  359
period  =  0.645498218981
period_SNR  =  49.2391482706
period_log10FAP  =  -54.4443274691
period_uncertainty  =  0.000115946658818
phase_cusum  =  0.244169578286
phase_eta  =  0.104047999209
phi21  =  -2.08539129443
phi31  =  -0.669815220273
quartile31  =  0.245
r21  =  0.408398330399
r31  =  0.194800171333
shapiro_w  =  0.940608859062
skewness  =  -0.421049985449
slope_per10  =  -0.198002250663
slope_per90  =  0.396131779783
stetson_k  =  0.827626249865
weighted_mean  =  14.0738521189
weighted_std  =  0.148226014121
