-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.26127443133
cusum  =  0.147171109258
eta  =  0.593576646208
hl_amp_ratio  =  0.485509256124
kurtosis  =  -0.918232183971
n_points  =  256
period  =  0.572643359798
period_SNR  =  37.5498094263
period_log10FAP  =  -32.8930382098
period_uncertainty  =  0.000160933999867
phase_cusum  =  0.302615025479
phase_eta  =  0.167409971271
phi21  =  0.915910772594
phi31  =  2.24513689285
quartile31  =  0.3525
r21  =  0.410629471009
r31  =  0.327369508332
shapiro_w  =  0.934889316559
skewness  =  -0.484922692313
slope_per10  =  -0.152702368662
slope_per90  =  0.206615307835
stetson_k  =  0.817744837362
weighted_mean  =  13.8274139788
weighted_std  =  0.230520015785
