-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.294878399333
cusum  =  0.122874721575
eta  =  0.523907274512
hl_amp_ratio  =  0.388857679697
kurtosis  =  -0.97759134588
n_points  =  151
period  =  0.560079398328
period_SNR  =  18.5106997206
period_log10FAP  =  -14.7718932551
period_uncertainty  =  0.000107205911858
phase_cusum  =  0.290399880633
phase_eta  =  0.456649975978
phi21  =  0.817276732809
phi31  =  -1.5541426266
quartile31  =  0.49
r21  =  0.409312999793
r31  =  0.422144856646
shapiro_w  =  0.88576477766
skewness  =  -0.644750032071
slope_per10  =  -0.121150001651
slope_per90  =  0.17401162465
stetson_k  =  0.775302392165
weighted_mean  =  12.1650993377
weighted_std  =  0.304643679713
