-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.61


######### Lightcurve features #########

amplitude  =  0.0129088078418
cusum  =  0.149849828319
eta  =  1.08838092535
hl_amp_ratio  =  1.0784574338
kurtosis  =  -0.501236948954
n_points  =  125
period  =  0.151217779139
period_SNR  =  11.6459723666
period_log10FAP  =  -5.63950350475
period_uncertainty  =  6.07349101867e-06
phase_cusum  =  0.240315800553
phase_eta  =  1.19348936362
phi21  =  -2.9946179907
phi31  =  -2.92427704642
quartile31  =  0.02
r21  =  0.161371700959
r31  =  0.0582445484001
shapiro_w  =  0.958830714226
skewness  =  -0.0259380201839
slope_per10  =  -0.251423251126
slope_per90  =  0.257470075444
stetson_k  =  0.804071605979
weighted_mean  =  14.73752
weighted_std  =  0.0154223733582
