-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.308520958987
cusum  =  0.173288731276
eta  =  0.489384486488
hl_amp_ratio  =  0.288996644764
kurtosis  =  -0.772790642514
n_points  =  291
period  =  0.638799295125
period_SNR  =  41.8187397296
period_log10FAP  =  -36.8636061539
period_uncertainty  =  0.000163686774489
phase_cusum  =  0.26480999308
phase_eta  =  0.329463543989
phi21  =  -2.16192812223
phi31  =  -3.99071463568
quartile31  =  0.465
r21  =  0.368752425422
r31  =  0.265222447153
shapiro_w  =  0.901327967644
skewness  =  -0.681020238454
slope_per10  =  -0.171909552207
slope_per90  =  0.165041449244
stetson_k  =  0.723518819534
weighted_mean  =  14.9524121933
weighted_std  =  0.285477083258
