-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.282399711065
cusum  =  0.127779981644
eta  =  0.63928125045
hl_amp_ratio  =  0.509623728949
kurtosis  =  -0.725936188903
n_points  =  316
period  =  0.562644537424
period_SNR  =  37.3267258304
period_log10FAP  =  -39.2924205354
period_uncertainty  =  0.000115588145142
phase_cusum  =  0.290057980192
phase_eta  =  0.0348019502715
phi21  =  3.84758682378
phi31  =  5.16804074271
quartile31  =  0.38
r21  =  0.547696578324
r31  =  0.410418715674
shapiro_w  =  0.924921810627
skewness  =  -0.624723677984
slope_per10  =  -0.219821929858
slope_per90  =  0.319953038936
stetson_k  =  0.810609514245
weighted_mean  =  15.5908780579
weighted_std  =  0.245607821721
