-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.155946113579
cusum  =  0.141221163809
eta  =  0.548559885896
hl_amp_ratio  =  1.17174590834
kurtosis  =  -1.07824105586
n_points  =  265
period  =  0.729137120067
period_SNR  =  34.2614032357
period_log10FAP  =  -32.1254141359
period_uncertainty  =  0.000151449225297
phase_cusum  =  0.257819321931
phase_eta  =  0.314408103816
phi21  =  -1.68918727689
phi31  =  -3.89654454586
quartile31  =  0.22
r21  =  0.343433105044
r31  =  0.155106468593
shapiro_w  =  0.956179141998
skewness  =  0.215874808651
slope_per10  =  -0.288593111855
slope_per90  =  0.462399995886
stetson_k  =  0.851106006413
weighted_mean  =  14.7146653069
weighted_std  =  0.128397835816
