-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.350935297378
cusum  =  0.145163146545
eta  =  0.775699052671
hl_amp_ratio  =  0.165449201039
kurtosis  =  0.606759218997
n_points  =  221
period  =  0.508396591079
period_SNR  =  35.3743987873
period_log10FAP  =  -26.8734403258
period_uncertainty  =  0.00017468492399
phase_cusum  =  0.288224556717
phase_eta  =  0.26967474149
phi21  =  3.7505974285
phi31  =  4.49891133234
quartile31  =  0.35
r21  =  0.410488562934
r31  =  0.273252396752
shapiro_w  =  0.811206698418
skewness  =  -1.28970083843
slope_per10  =  -0.19050570207
slope_per90  =  0.270244860606
stetson_k  =  0.619777053356
weighted_mean  =  13.3752001377
weighted_std  =  0.278120041007
