-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.56


######### Lightcurve features #########

amplitude  =  0.43780809368
cusum  =  0.156696908937
eta  =  1.45009599308
hl_amp_ratio  =  1.15161053185
kurtosis  =  -0.446776623513
n_points  =  108
period  =  0.065117302178
period_SNR  =  9.55531240908
period_log10FAP  =  -1.05181521332
period_uncertainty  =  9.63473236949e-07
phase_cusum  =  0.163947738265
phase_eta  =  1.32156256249
phi21  =  -1.60388273093
phi31  =  0.219774781396
quartile31  =  0.8975
r21  =  0.133123275194
r31  =  0.124138177797
shapiro_w  =  0.983909666538
skewness  =  0.256754669739
slope_per10  =  -0.00665006555414
slope_per90  =  0.00651177418728
stetson_k  =  0.822316503518
weighted_mean  =  11.7558513932
weighted_std  =  0.588602902895
