-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.0166624326051
cusum  =  0.0685285731292
eta  =  2.17607092566
hl_amp_ratio  =  1.03765113413
kurtosis  =  0.510351126501
n_points  =  289
period  =  0.110477441516
period_SNR  =  14.1339006335
period_log10FAP  =  -0.960787864769
period_uncertainty  =  4.89475607997e-06
phase_cusum  =  0.104245091205
phase_eta  =  1.62320955625
phi21  =  3.23983034786
phi31  =  2.9153859211
quartile31  =  0.04
r21  =  0.114241577058
r31  =  0.178714677229
shapiro_w  =  0.985977292061
skewness  =  -0.148981726965
slope_per10  =  -0.0406105960538
slope_per90  =  0.0493607211342
stetson_k  =  0.792109065289
weighted_mean  =  16.0473472586
weighted_std  =  0.035995254417
