-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.301309669371
cusum  =  0.224346699526
eta  =  0.582896158044
hl_amp_ratio  =  0.487168128402
kurtosis  =  -0.859505119766
n_points  =  215
period  =  0.643332674846
period_SNR  =  27.6317269934
period_log10FAP  =  -26.5587859507
period_uncertainty  =  0.000118164112791
phase_cusum  =  0.247496169073
phase_eta  =  0.08641308934
phi21  =  0.989376107481
phi31  =  2.13306696766
quartile31  =  0.43
r21  =  0.540989288496
r31  =  0.345538361957
shapiro_w  =  0.946399509907
skewness  =  -0.475953590945
slope_per10  =  -0.258500012569
slope_per90  =  0.274666662638
stetson_k  =  0.787684881493
weighted_mean  =  16.5315003158
weighted_std  =  0.267929548539
