-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.26844813492
cusum  =  0.140690549889
eta  =  0.541060528779
hl_amp_ratio  =  0.319176004204
kurtosis  =  -0.661037209367
n_points  =  285
period  =  0.585645541538
period_SNR  =  38.0984239491
period_log10FAP  =  -33.2870598256
period_uncertainty  =  0.000157178094764
phase_cusum  =  0.212610988931
phase_eta  =  0.226688745536
phi21  =  -2.21545261755
phi31  =  -4.31733623212
quartile31  =  0.35
r21  =  0.479983178575
r31  =  0.344159181533
shapiro_w  =  0.904160380363
skewness  =  -0.726382063824
slope_per10  =  -0.180237079017
slope_per90  =  0.1649767576
stetson_k  =  0.721104932583
weighted_mean  =  15.8162022256
weighted_std  =  0.249961934325
