-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.290143226449
cusum  =  0.105285552045
eta  =  0.647327462185
hl_amp_ratio  =  0.584426591032
kurtosis  =  -0.464975190397
n_points  =  498
period  =  0.617535320377
period_SNR  =  50.7278538617
period_log10FAP  =  -54.7527305715
period_uncertainty  =  0.000102396918597
phase_cusum  =  0.233866023503
phase_eta  =  0.306384455469
phi21  =  -2.28872195612
phi31  =  -4.21263193332
quartile31  =  0.4075
r21  =  0.565351677694
r31  =  0.422288989874
shapiro_w  =  0.95057785511
skewness  =  -0.588444301488
slope_per10  =  -0.0716077838809
slope_per90  =  0.0767077960621
stetson_k  =  0.78846974576
weighted_mean  =  12.6772718121
weighted_std  =  0.277360594304
