-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.331594305701
cusum  =  0.176435216849
eta  =  0.564411841877
hl_amp_ratio  =  0.472436710598
kurtosis  =  -0.524387500929
n_points  =  283
period  =  0.609319965091
period_SNR  =  37.9031406851
period_log10FAP  =  -33.1579005288
period_uncertainty  =  0.000191422794625
phase_cusum  =  0.233450809487
phase_eta  =  0.620574078627
phi21  =  4.23431487575
phi31  =  5.69266144008
quartile31  =  0.46
r21  =  0.327326767271
r31  =  0.068318168231
shapiro_w  =  0.930832624435
skewness  =  -0.574804112801
slope_per10  =  -0.0902437280129
slope_per90  =  0.186738213888
stetson_k  =  0.773913336893
weighted_mean  =  14.5187497296
weighted_std  =  0.294230583675
