-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.213856309738
cusum  =  0.169679289871
eta  =  0.560011166492
hl_amp_ratio  =  0.54123507507
kurtosis  =  -0.218166584849
n_points  =  215
period  =  0.620670803742
period_SNR  =  27.5552858901
period_log10FAP  =  -26.766649219
period_uncertainty  =  0.000109985614979
phase_cusum  =  0.219293714159
phase_eta  =  0.164137034789
phi21  =  -2.10314107676
phi31  =  -4.09761121259
quartile31  =  0.175
r21  =  0.456959267852
r31  =  0.281474777847
shapiro_w  =  0.936446011066
skewness  =  -0.758316889984
slope_per10  =  -0.278566052596
slope_per90  =  0.32904703804
stetson_k  =  0.770718882694
weighted_mean  =  15.2049549955
weighted_std  =  0.131878768859
