-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.446469510476
cusum  =  0.263818418489
eta  =  0.306938315171
hl_amp_ratio  =  0.609308444374
kurtosis  =  -0.300741125423
n_points  =  292
period  =  0.997304260694
period_SNR  =  20.0376817666
period_log10FAP  =  -17.556873165
period_uncertainty  =  0.000279952935136
phase_cusum  =  0.193460268129
phase_eta  =  0.999049233602
phi21  =  1.75013642363
phi31  =  1.56186515763
quartile31  =  0.4525
r21  =  0.709764236743
r31  =  0.237888300964
shapiro_w  =  0.962940812111
skewness  =  -0.55603959806
slope_per10  =  -0.0401609287519
slope_per90  =  0.0830390255488
stetson_k  =  0.80387303007
weighted_mean  =  11.7993835616
weighted_std  =  0.32359966516
