-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.51


######### Lightcurve features #########

amplitude  =  0.178321855161
cusum  =  0.446208058414
eta  =  0.854623330814
hl_amp_ratio  =  0.511766315719
kurtosis  =  -1.19057883785
n_points  =  8
period  =  0.0933053716216
period_SNR  =  1.46490062309
period_log10FAP  =  0.0
period_uncertainty  =  1.77090365273e-06
phase_cusum  =  0.446208058414
phase_eta  =  0.854623330814
phi21  =  3.60617349754
phi31  =  3.53335601526
quartile31  =  0.045
r21  =  0.150437222027
r31  =  0.38777978071
shapiro_w  =  0.912912666798
skewness  =  -0.419071720221
slope_per10  =  -0.363299995661
slope_per90  =  0.710247740886
stetson_k  =  0.746390491252
weighted_mean  =  10.49875
weighted_std  =  0.0297647022495
