-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.327181576273
cusum  =  0.118244139934
eta  =  0.58737180667
hl_amp_ratio  =  0.684325195739
kurtosis  =  -0.720189960685
n_points  =  221
period  =  0.613974555122
period_SNR  =  29.5027116333
period_log10FAP  =  -22.8950856398
period_uncertainty  =  0.000177603295824
phase_cusum  =  0.281108726143
phase_eta  =  0.287395944872
phi21  =  0.905587705408
phi31  =  -0.877250628613
quartile31  =  0.41
r21  =  0.520586344783
r31  =  0.351699763143
shapiro_w  =  0.958619296551
skewness  =  -0.439279222774
slope_per10  =  -0.141971177877
slope_per90  =  0.121668367704
stetson_k  =  0.792804553748
weighted_mean  =  17.2138577068
weighted_std  =  0.296253527629
