-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.260135128458
cusum  =  0.17620097272
eta  =  0.566213054422
hl_amp_ratio  =  0.762006668802
kurtosis  =  -0.0157865437848
n_points  =  357
period  =  0.746536732352
period_SNR  =  35.4731502302
period_log10FAP  =  -35.2556217214
period_uncertainty  =  0.0001551922425
phase_cusum  =  0.269705102652
phase_eta  =  0.530902380878
phi21  =  0.933461072834
phi31  =  -0.449032551453
quartile31  =  0.38
r21  =  0.334368129589
r31  =  0.273644907203
shapiro_w  =  0.983819007874
skewness  =  -0.345391527314
slope_per10  =  -0.10943365832
slope_per90  =  0.178585399157
stetson_k  =  0.81409992125
weighted_mean  =  11.3815966387
weighted_std  =  0.256073507457
