-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.29695252928
cusum  =  0.142757148327
eta  =  0.535413633781
hl_amp_ratio  =  0.409940796985
kurtosis  =  -0.552640396561
n_points  =  348
period  =  0.652585846909
period_SNR  =  40.222792841
period_log10FAP  =  -40.0940205781
period_uncertainty  =  0.000116068914827
phase_cusum  =  0.343514592175
phase_eta  =  0.501675172724
phi21  =  -2.13306147212
phi31  =  -1.05240286263
quartile31  =  0.44
r21  =  0.466293075755
r31  =  0.236001301797
shapiro_w  =  0.910690188408
skewness  =  -0.480739722507
slope_per10  =  -0.104495046256
slope_per90  =  0.288506269894
stetson_k  =  0.758702964522
weighted_mean  =  14.4125317308
weighted_std  =  0.285730197431
