-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.49


######### Lightcurve features #########

amplitude  =  0.312010232733
cusum  =  0.179155806169
eta  =  0.453355863988
hl_amp_ratio  =  0.386645563224
kurtosis  =  -0.585930821112
n_points  =  363
period  =  0.256103604798
period_SNR  =  28.8179776133
period_log10FAP  =  -28.0858309669
period_uncertainty  =  1.83271508556e-05
phase_cusum  =  0.204662607657
phase_eta  =  1.16743204093
phi21  =  -1.35607175054
phi31  =  0.912759299946
quartile31  =  0.58
r21  =  0.115274586209
r31  =  0.142860942662
shapiro_w  =  0.908624172211
skewness  =  -0.708086790798
slope_per10  =  -0.0192199662184
slope_per90  =  0.0230024462109
stetson_k  =  0.778407838562
weighted_mean  =  11.386584022
weighted_std  =  0.328544516221
