-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.254401163879
cusum  =  0.0780665870939
eta  =  0.620231391847
hl_amp_ratio  =  0.407012997347
kurtosis  =  -0.0733655260472
n_points  =  341
period  =  0.651305616408
period_SNR  =  39.5048391062
period_log10FAP  =  -40.4516792473
period_uncertainty  =  0.00011843643386
phase_cusum  =  0.258087539536
phase_eta  =  0.307746626009
phi21  =  3.99602544557
phi31  =  4.94616476432
quartile31  =  0.28
r21  =  0.330627049467
r31  =  0.162469322038
shapiro_w  =  0.927562475204
skewness  =  -0.82670109498
slope_per10  =  -0.104611024818
slope_per90  =  0.217910461387
stetson_k  =  0.748194205303
weighted_mean  =  15.3189409804
weighted_std  =  0.207406910424
