-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.37


######### Lightcurve features #########

amplitude  =  0.364473760808
cusum  =  0.13226161997
eta  =  0.448198545484
hl_amp_ratio  =  0.382931615472
kurtosis  =  -0.850617123806
n_points  =  97
period  =  0.932189550684
period_SNR  =  12.0688049313
period_log10FAP  =  -8.61857767839
period_uncertainty  =  0.000303513018072
phase_cusum  =  0.38861147903
phase_eta  =  0.349941309375
phi21  =  -2.21407110855
phi31  =  -4.08903789167
quartile31  =  0.56
r21  =  0.171803210284
r31  =  0.159275263404
shapiro_w  =  0.898733198643
skewness  =  -0.643067162697
slope_per10  =  -0.372400001312
slope_per90  =  0.575799979269
stetson_k  =  0.764976167689
weighted_mean  =  16.5223981187
weighted_std  =  0.297419376856
