-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.249593417343
cusum  =  0.120095631587
eta  =  0.550064846346
hl_amp_ratio  =  0.894421371349
kurtosis  =  -1.0894522419
n_points  =  354
period  =  0.57293009055
period_SNR  =  39.3658697287
period_log10FAP  =  -42.5584237318
period_uncertainty  =  0.000109602750577
phase_cusum  =  0.262021832146
phase_eta  =  0.223042229557
phi21  =  -2.09912396421
phi31  =  -3.94952688379
quartile31  =  0.38
r21  =  0.506568638701
r31  =  0.36052121809
shapiro_w  =  0.949627101421
skewness  =  -0.245143915712
slope_per10  =  -0.11359754565
slope_per90  =  0.191831773983
stetson_k  =  0.870108975235
weighted_mean  =  15.5885879888
weighted_std  =  0.22888391945
