-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.33422886273
cusum  =  0.155133009238
eta  =  0.585289667909
hl_amp_ratio  =  0.647307832034
kurtosis  =  -1.08793550524
n_points  =  261
period  =  0.595380887598
period_SNR  =  44.0009460132
period_log10FAP  =  -37.7522564926
period_uncertainty  =  0.000180942406578
phase_cusum  =  0.243677455383
phase_eta  =  0.292686126458
phi21  =  0.976396639239
phi31  =  2.24615030885
quartile31  =  0.51
r21  =  0.312650520458
r31  =  0.146952632885
shapiro_w  =  0.934250473976
skewness  =  -0.386457027144
slope_per10  =  -0.109366412349
slope_per90  =  0.197759480356
stetson_k  =  0.839489459763
weighted_mean  =  14.1016294421
weighted_std  =  0.281376082611
