-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.74


######### Lightcurve features #########

amplitude  =  0.112957977698
cusum  =  0.176295252046
eta  =  1.89248217253
hl_amp_ratio  =  2.28963370307
kurtosis  =  16.2600350713
n_points  =  82
period  =  2.40281423677
period_SNR  =  12.9782086238
period_log10FAP  =  -1.69572369277
period_uncertainty  =  0.00260609213568
phase_cusum  =  0.296683787565
phase_eta  =  1.4269644203
phi21  =  2.65273981775
phi31  =  2.97471948688
quartile31  =  0.1075
r21  =  0.384601612308
r31  =  0.290682447414
shapiro_w  =  0.753437995911
skewness  =  2.61313206575
slope_per10  =  -1.1335999798
slope_per90  =  1.11779999919
stetson_k  =  0.630541808885
weighted_mean  =  13.9596923273
weighted_std  =  0.116617405554
