-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.226089756102
cusum  =  0.121615220745
eta  =  0.729869630186
hl_amp_ratio  =  0.404664146796
kurtosis  =  -0.871144164833
n_points  =  206
period  =  0.610398548004
period_SNR  =  34.0704884419
period_log10FAP  =  -27.9668925143
period_uncertainty  =  0.000109736546625
phase_cusum  =  0.243485411564
phase_eta  =  0.236249823897
phi21  =  -2.45867334325
phi31  =  -1.18944104879
quartile31  =  0.29
r21  =  0.411884172972
r31  =  0.194110187557
shapiro_w  =  0.923177719116
skewness  =  -0.577647505997
slope_per10  =  -0.155038396266
slope_per90  =  0.281522690904
stetson_k  =  0.763707540221
weighted_mean  =  16.0763432766
weighted_std  =  0.190425151223
