-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.315061957042
cusum  =  0.130301220623
eta  =  0.591417658483
hl_amp_ratio  =  0.4867145961
kurtosis  =  -0.68475061027
n_points  =  430
period  =  0.635313360996
period_SNR  =  54.6762237702
period_log10FAP  =  -52.9155703397
period_uncertainty  =  0.000108031794761
phase_cusum  =  0.263179038513
phase_eta  =  0.288219433155
phi21  =  0.786592060962
phi31  =  -1.1308603072
quartile31  =  0.44
r21  =  0.465124667605
r31  =  0.298252872092
shapiro_w  =  0.948401212692
skewness  =  -0.516237011577
slope_per10  =  -0.0908749992959
slope_per90  =  0.0526939823448
stetson_k  =  0.756857934551
weighted_mean  =  17.8811480104
weighted_std  =  0.276957012225
