-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.296006932201
cusum  =  0.109059582633
eta  =  0.683064310973
hl_amp_ratio  =  0.513572774439
kurtosis  =  -0.387171507309
n_points  =  337
period  =  0.657039034616
period_SNR  =  42.8733073522
period_log10FAP  =  -40.0431279439
period_uncertainty  =  0.000117715181106
phase_cusum  =  0.282051677746
phase_eta  =  0.2417262265
phi21  =  0.82682652468
phi31  =  -1.17346029289
quartile31  =  0.34
r21  =  0.472654394495
r31  =  0.246474190664
shapiro_w  =  0.938183128834
skewness  =  -0.675135545272
slope_per10  =  -0.11002440745
slope_per90  =  0.262945486776
stetson_k  =  0.771364388249
weighted_mean  =  16.0694446617
weighted_std  =  0.238572854766
