-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.391466693609
cusum  =  0.0885475322053
eta  =  0.501022192787
hl_amp_ratio  =  0.434290600215
kurtosis  =  -1.195530807
n_points  =  403
period  =  0.777214172531
period_SNR  =  51.9354430518
period_log10FAP  =  -58.0270622108
period_uncertainty  =  0.000168783488473
phase_cusum  =  0.220893549081
phase_eta  =  0.422017828211
phi21  =  -1.96661416556
phi31  =  -3.76440909317
quartile31  =  0.545
r21  =  0.34548998437
r31  =  0.158096499019
shapiro_w  =  0.923035025597
skewness  =  -0.378934489202
slope_per10  =  -0.112197449615
slope_per90  =  0.151115301241
stetson_k  =  0.81421529267
weighted_mean  =  13.0103438155
weighted_std  =  0.329353548937
