-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.258040277149
cusum  =  0.122098000465
eta  =  0.744918596842
hl_amp_ratio  =  0.396995813764
kurtosis  =  -0.0400579133899
n_points  =  209
period  =  0.527469242862
period_SNR  =  27.5140295175
period_log10FAP  =  -23.1331623904
period_uncertainty  =  0.000127101029294
phase_cusum  =  0.26344844789
phase_eta  =  0.571976643468
phi21  =  -2.67480429674
phi31  =  -4.74426879643
quartile31  =  0.31
r21  =  0.306836145114
r31  =  0.154878361156
shapiro_w  =  0.926053762436
skewness  =  -0.819445911763
slope_per10  =  -0.109220191716
slope_per90  =  0.190079997992
stetson_k  =  0.746312743349
weighted_mean  =  15.9187978755
weighted_std  =  0.209883345576
