-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.342872449984
cusum  =  0.263635813377
eta  =  0.342470826532
hl_amp_ratio  =  0.793267455291
kurtosis  =  0.393877498941
n_points  =  291
period  =  0.997303792834
period_SNR  =  20.9375564481
period_log10FAP  =  -18.3224223028
period_uncertainty  =  0.000333955989953
phase_cusum  =  0.186722554596
phase_eta  =  0.874673676584
phi21  =  -0.220741438244
phi31  =  1.65211436963
quartile31  =  0.39
r21  =  0.405738295473
r31  =  0.194512612172
shapiro_w  =  0.935719609261
skewness  =  -0.844073512008
slope_per10  =  -0.0944371304325
slope_per90  =  0.0825085695833
stetson_k  =  0.78716719557
weighted_mean  =  11.4794182706
weighted_std  =  0.287574714321
