-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.515186391153
cusum  =  0.229024266776
eta  =  0.500491310314
hl_amp_ratio  =  0.251296405433
kurtosis  =  -0.390364862548
n_points  =  246
period  =  0.468762388378
period_SNR  =  28.7234807768
period_log10FAP  =  -23.3965585301
period_uncertainty  =  0.000105162627145
phase_cusum  =  0.274260870294
phase_eta  =  0.262456375379
phi21  =  0.74814380466
phi31  =  1.94676030658
quartile31  =  0.7125
r21  =  0.53679990731
r31  =  0.39572108194
shapiro_w  =  0.86903655529
skewness  =  -0.915120154506
slope_per10  =  -0.0574528812048
slope_per90  =  0.147904329268
stetson_k  =  0.70339121821
weighted_mean  =  12.2992097902
weighted_std  =  0.526075858727
