-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.29557521741
cusum  =  0.138450296304
eta  =  0.56300914054
hl_amp_ratio  =  0.696869360204
kurtosis  =  -0.675879294191
n_points  =  380
period  =  0.642903317456
period_SNR  =  49.301133633
period_log10FAP  =  -44.461879099
period_uncertainty  =  0.000117791011025
phase_cusum  =  0.222112474296
phase_eta  =  0.336414883223
phi21  =  -2.06399058487
phi31  =  -4.09690848207
quartile31  =  0.395
r21  =  0.526607047308
r31  =  0.263895501847
shapiro_w  =  0.967127799988
skewness  =  -0.418440874175
slope_per10  =  -0.0848994113222
slope_per90  =  0.101092747881
stetson_k  =  0.807461792295
weighted_mean  =  13.8469028259
weighted_std  =  0.270207028996
