-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.2197066196
cusum  =  0.150524831875
eta  =  0.52074062499
hl_amp_ratio  =  0.495550861656
kurtosis  =  -0.839057554557
n_points  =  406
period  =  0.585439657637
period_SNR  =  46.0018809903
period_log10FAP  =  -48.0314203305
period_uncertainty  =  0.000110127855221
phase_cusum  =  0.27354705731
phase_eta  =  0.266335183854
phi21  =  0.903202865022
phi31  =  -1.07456361927
quartile31  =  0.2975
r21  =  0.507180480071
r31  =  0.252895112871
shapiro_w  =  0.950507462025
skewness  =  -0.460275055856
slope_per10  =  -0.114588183287
slope_per90  =  0.148317581916
stetson_k  =  0.786498451065
weighted_mean  =  16.1936001203
weighted_std  =  0.18774322492
