-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.161539757502
cusum  =  0.103489817341
eta  =  0.751524043223
hl_amp_ratio  =  1.09748060396
kurtosis  =  -0.944374666457
n_points  =  353
period  =  0.628341498809
period_SNR  =  46.3225954745
period_log10FAP  =  -47.5550060738
period_uncertainty  =  0.000113402670816
phase_cusum  =  0.23745389557
phase_eta  =  0.429300202143
phi21  =  1.30888247768
phi31  =  -0.362828171623
quartile31  =  0.23
r21  =  0.362618783306
r31  =  0.205749493169
shapiro_w  =  0.9723482728
skewness  =  0.00809755876567
slope_per10  =  -0.148776349958
slope_per90  =  0.130545962718
stetson_k  =  0.864783207669
weighted_mean  =  16.8543388739
weighted_std  =  0.135194791049
