-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.260533262932
cusum  =  0.117209074174
eta  =  0.57234564367
hl_amp_ratio  =  0.839473173338
kurtosis  =  -0.668500014644
n_points  =  350
period  =  0.656910513631
period_SNR  =  36.6121957521
period_log10FAP  =  -36.7576800643
period_uncertainty  =  0.000120684622082
phase_cusum  =  0.24168110113
phase_eta  =  0.347312011341
phi21  =  0.971900732536
phi31  =  -0.684546294711
quartile31  =  0.3075
r21  =  0.500925103668
r31  =  0.289335161687
shapiro_w  =  0.969090640545
skewness  =  -0.389068226894
slope_per10  =  -0.145166204224
slope_per90  =  0.113097571386
stetson_k  =  0.828501193724
weighted_mean  =  11.8512285714
weighted_std  =  0.19613094543
