-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.286255763184
cusum  =  0.126524604273
eta  =  0.536803239959
hl_amp_ratio  =  0.419527872331
kurtosis  =  -0.301036141378
n_points  =  241
period  =  0.608451839106
period_SNR  =  32.2496070156
period_log10FAP  =  -28.0698926912
period_uncertainty  =  0.000158616235562
phase_cusum  =  0.257802324197
phase_eta  =  0.0902778414512
phi21  =  0.958820273759
phi31  =  -0.952837032925
quartile31  =  0.31
r21  =  0.559805602421
r31  =  0.386251295538
shapiro_w  =  0.932881355286
skewness  =  -0.743596592986
slope_per10  =  -0.171700778199
slope_per90  =  0.416249284392
stetson_k  =  0.74116051195
weighted_mean  =  13.2947323923
weighted_std  =  0.251099033771
