-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.300606170773
cusum  =  0.179275837678
eta  =  0.510207020655
hl_amp_ratio  =  0.282756906257
kurtosis  =  -0.505727427411
n_points  =  95
period  =  0.648454931322
period_SNR  =  14.033089422
period_log10FAP  =  -10.1079228399
period_uncertainty  =  0.000255555973978
phase_cusum  =  0.271020213328
phase_eta  =  0.123772982186
phi21  =  -2.25452523293
phi31  =  -1.27680654268
quartile31  =  0.34
r21  =  0.388942846132
r31  =  0.192374150355
shapiro_w  =  0.873758137226
skewness  =  -0.866518360782
slope_per10  =  -0.201642467112
slope_per90  =  0.479679151013
stetson_k  =  0.70289009865
weighted_mean  =  15.7745212183
weighted_std  =  0.24198716978
